Scale chr12:

5 kb mm9 111,827,000 111,828,000 111,829,000 111,830,000 111,831,000 111,832,000 111,833,000 111,834,000 111,835,000 UCSC Genes (RefSeq, GenBank, tRNAs & Comparative Genomics) B930059L03Rik