Scale chrM:

5 kb mm9 1,000 2,000 3,000 4,000 5,000 6,000 7,000 8,000 9,000 10,000 11,000 12,000 13,000 14,000 15,000 16,000 B cell RNA-seq (+)

B cell RNA-seq (-)

ES cell RNA-seq (+)

ES cell RNA-seq (-)

B Cell Exotome ES Cell Exotome UCSC Genes (RefSeq, GenBank, tRNAs & Comparative Genomics) AK140265 GU332589 AK018753

AK163440 DQ539915

Cox2

Atpase6

AK141672 mt-Nd4

BC071253 Cytb

BC(+)

1477.97 _

0 _

BC(-)

0 _

-585.927 _

ES(+)

1068.09 _

0 _

ES(-)

0 _

-706.942 _