Scale chr12:

BX7677- BX41020+

EX14444- EX77430+ EX14445- EX14446- EX77431+ EX14447- EX14447- EX14447-

Bismap S24 +

Umap S24

5 kb mm9 111,827,000 111,828,000 111,829,000 111,830,000 111,831,000 111,832,000 111,833,000 111,834,000 111,835,000 B cell RNA-seq (+)

B cell RNA-seq (-)

ES cell RNA-seq (+)

ES cell RNA-seq (-)

B Cell Exotome

ES Cell Exotome

Multi-read mappability with 24-mers after bisulfite conversion

Single-read mappability with 24-mers after bisulfite conversion (forward strand)

Multi-read mappability with 24-mers

Single-read mappability with 24-mers

UCSC Genes (RefSeq, GenBank, tRNAs & Comparative Genomics) B930059L03Rik

BC(+)

6.54397 _

0 _

BC(-)

0 _

-9.61383 _

ES(+)

32.3232 _

0 _

ES(-)

0 _

-64.8271 _

Bismap M24

1 _

0 _

Umap M24

1 _

0 _