Scale chr16:

BX46280+ BX46280+ BX46280+ BX46280+ BX46280+

EX87385+ EX87385+ EX87385+

2 kb mm9 90,221,500 90,222,000 90,222,500 90,223,000 90,223,500 90,224,000 90,224,500 90,225,000 90,225,500 90,226,000 90,226,500 B cell RNA-seq (+)

B cell RNA-seq (-)

ES cell RNA-seq (+)

ES cell RNA-seq (-)

B Cell Exotome

ES Cell Exotome

UCSC Genes (RefSeq, GenBank, tRNAs & Comparative Genomics) Sod1

BC(+)

159.965 _

0 _

BC(-)

0 _

-3.30103 _

ES(+)

371.119 _

0 _

ES(-)

0 _

-2.70179 _